Stereochemical Histogram

1

1 0

1 0 0

1 , 0 0 0

1 0 , 0 0 0

1 0 0 , 0 0 0

1 , 0 0 0 , 0 0 0

1 0 , 0 0 0 , 0 0 0

0 5 1 0 1 5 2 0 2 5 3 0 3 5 4 0 4 5 > 5 0

N u m b e r o f S t e r e o c e n t e r s

Number of Chemicals