Molecular Weight vs. Number of Chemicals

0

2 0 0 0 0

4 0 0 0 0

6 0 0 0 0

8 0 0 0 0

1 0 0 0 0 0

1 2 0 0 0 0

1 4 0 0 0 0

0

340 680

1020 1360 1700 2040 2380 2720 3060 3400 3740 4080 4420 4760 5100 5440 5780 6120 6460 6800 7140 7480 7820 8160 8500 8840 9180 9520 9860

10200 10540 10880 11220 11560 11900

M o l e c u l a r W e i g h t

Number of Chemicals

M o l e c u l a r W e i g h t v s . N u m b e r o f M o l e c u l e s ( d e t a i l )

0

2 0 0 0 0

4 0 0 0 0

6 0 0 0 0

8 0 0 0 0

1 0 0 0 0 0

1 2 0 0 0 0

1 4 0 0 0 0

1 0 5 0 9 0

1 3 0

1 7 0

2 1 0

2 5 0

2 9 0

3 3 0

3 7 0

4 1 0

4 5 0

4 9 0

5 3 0

5 7 0

6 1 0

6 5 0

6 9 0

7 3 0

7 7 0

8 1 0

8 5 0

8 9 0

9 3 0

9 7 0

M o l e c u l a r W e i g h t

Number of Chemicals